en	Enable internal tools useful for developers and testers from Alt-F2

en	Allows access to internal debugging and monitoring tools using the Alt-F2 dialog.

en	GNOME Shell extensions have a UUID property; this key lists extensions which should be loaded. Any extension that wants to be loaded needs to be in this list. You can also manipulate this list with the EnableExtension and DisableExtension D-Bus methods on org.gnome.Shell.

en	GNOME Shell extensions have a UUID property; this key lists extensions which should be disabled, even if loaded as part of the current mode. You can also manipulate this list with the EnableExtension and DisableExtension D-Bus methods on org.gnome.Shell. This key takes precedence over the “enabled-extensions” setting.

en	Disable all extensions the user has enabled without affecting the “enabled-extension” setting.

en	Disables the validation of extension version compatibility

en	GNOME Shell will only load extensions that claim to support the current running version. Enabling this option will disable this check and try to load all extensions regardless of the versions they claim to support.

en	The applications corresponding to these identifiers will be displayed in the favorites area.

en	This key overrides the automatic hiding of the “Log out” menu item in single-user, single-session situations.

en	The shell will request a password when an encrypted device or a remote filesystem is mounted. If the password can be saved for future use a “Remember Password” checkbox will be present. This key sets the default state of the checkbox.

en	Some systems support more than two power profiles. In order to still support toggling between two profiles, this key records the last selected non-default profile.

en	The last version the “Welcome to GNOME” dialog was shown for

en	This key determines for which version the “Welcome to GNOME” dialog was last shown. An empty string represents the oldest possible version, and a huge number will represent versions that do not exist yet. This huge number can be used to effectively disable the dialog.

en	Layout of the app picker. Each entry in the array is a page. Pages are stored in the order they appear in GNOME Shell. Each page contains an “application id” → 'data' pair. Currently, the following values are stored as 'data': • “position”: the position of the application icon in the page

en	The installed udisks version does not support the PIM setting

en	Screen Locking requires the GNOME display manager.

en	Auto Rotate

en	Dark Mode

en	If you want to learn your way around, check out the tour.

en	GNOME Extensions handles updating extensions, configuring extension preferences and removing or disabling unwanted extensions.

en	If you remove the extension, you need to return to download it if you want to enable it again

en	%d extension will be updated on next login.

en	Extensions can cause performance and stability issues. Disable extensions if you encounter problems with your system.

en	We’re very sorry, but it was not possible to get the list of installed extensions. Make sure you are logged into GNOME and try again.

en	The new extension was successfully created in %s.

en	Name should be a very short (ideally descriptive) string. Examples are: %s

en	Description is a single-sentence explanation of what your extension does. Examples are: %s

en	UUID is a globally-unique identifier for your extension. This should be in the format of an email address (clicktofocus@janedoe.example.com)

en	Choose one of the available templates:

en	The unique identifier of the new extension

en	The user-visible name of the new extension

en	A short description of what the extension does

en	The template to use for the new extension

en	Enter extension information interactively

en	Additional source to include in the bundle

en	A GSettings schema that should be included

en	The directory where translations are found

en	The gettext domain to use for translations

en	The directory where the pack should be created